The court is built on a massive scale. The throne room alone is five hundred feet across, with pillars carved from living coral reaching up to the ocean dome. Storm giant guards stand at every entrance, each one thirty feet tall and crackling with lightning. At the far end of the hall, on an enormous throne of blue crystal, sits a young storm giant woman with flowing silver hair. Princess Serissa.