The chamber is enormous, two hundred feet across and a hundred feet high. In the center is a raised platform with six pedestals arranged in a circle, each bearing the symbol of a giant type. In the center of the circle is a seventh pedestal, taller than the rest, bearing the rune of Annam. Above it all floats an enormous crystal, slowly rotating, pulsing with light. This is the oracle.