Bramble, you crawl through the pipe for about fifty feet. Its slimy and smells terrible but there are no traps. You emerge in a large cistern beneath the fortress. Stone walkways circle a pool of dark water. You can hear the drip of water echoing and distant sounds of activity above. There are two exits, stairs going up to the north and a corridor heading east.