He is a storm giant of immense size, easily forty feet tall, chained to the cave floor by adamantine shackles on his wrists, ankles, and neck. His royal armor has been stripped away and he is covered in wounds, some fresh. His eyes are open but glazed, and a dark metal circlet on his head pulses with purple energy. He seems to be in some kind of magical stupor, awake but unaware.