The tracks are easy to follow, the townspeople were panicked and didnt try to hide their trail. After about two hours of hiking through hilly terrain, you come to a rocky hillside with a large cave entrance. Water is dripping from the rocks above, and you can smell something foul from within. This is the Dripping Caves.