Hekaton flexes and the adamantine chains groan. He is still weak from captivity but he is a storm giant king. With a tremendous effort he snaps the chains on his wrists, then his ankles, then his neck. He stands to his full height, forty feet tall, and lightning crackles across his body. I am diminished, he says, but I am not broken.